UPDATE TBDD_MODULES SET DB_VERSION = '2.0.0.6' where NAME = 'Process-Manager'
GO
ALTER TABLE [TBPM_CONTROL_TABLE] 
ADD [SUMMARY_FUNCTION] VARCHAR(20) NOT NULL DEFAULT ('NONE')
GO