UPDATE TBDD_MODULES SET DB_VERSION = '2.0.0.3' where NAME = 'Process-Manager'
GO
ALTER TABLE TBPM_CONTROL_TABLE ADD DEFAULT_VALUE VARCHAR (MAX) NOT NULL DEFAULT '';
ALTER TABLE TBPM_CONTROL_TABLE ADD ADVANCED_LOOKUP BIT NOT NULL DEFAULT 0;
