UPDATE TBDD_MODULES SET DB_VERSION = '2.4.0.0' where NAME = 'Global-Indexer' 
GO
ALTER TABLE TBDD_INDEX_AUTOM ADD [SEQUENCE] TINYINT NOT NULL DEFAULT 0;