SET ANSI_NULLS ON
GO
SET QUOTED_IDENTIFIER ON
GO

CREATE TABLE [dbo].[TBREC_CFG_ENDPOINT](
	[GUID] [bigint] IDENTITY(1,1) NOT NULL,
	[ACTIVE] [bit] NOT NULL,
	[DESCRIPTION] [nvarchar](250) NULL,
	[URI] [nvarchar](2000) NOT NULL,
	[ADDED_WHO] [nvarchar](50) NOT NULL,
	[ADDED_WHEN] [datetime] NOT NULL,
	[CHANGED_WHO] [nvarchar](50) NULL,
	[CHANGED_WHEN] [datetime] NULL,
 CONSTRAINT [PK_TBREC_CFG_ENDPOINT] PRIMARY KEY CLUSTERED 
(
	[GUID] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON, OPTIMIZE_FOR_SEQUENTIAL_KEY = OFF) ON [PRIMARY]
) ON [PRIMARY]
GO

ALTER TABLE [dbo].[TBREC_CFG_ENDPOINT] ADD  CONSTRAINT [DF_TBREC_CFG_ENDPOINT_ADDED_WHO]  DEFAULT (SUSER_SNAME()) FOR [ADDED_WHO]
GO

ALTER TABLE [dbo].[TBREC_CFG_ENDPOINT] ADD  CONSTRAINT [DF_TBREC_CFG_ENDPOINT_ADDED_WHEN]  DEFAULT (sysdatetime()) FOR [ADDED_WHEN]
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'Primärschlüssel' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'TBREC_CFG_ENDPOINT', @level2type=N'COLUMN',@level2name=N'GUID'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'Ein-/Ausschalter' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'TBREC_CFG_ENDPOINT', @level2type=N'COLUMN',@level2name=N'ACTIVE'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'Beschreibung' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'TBREC_CFG_ENDPOINT', @level2type=N'COLUMN',@level2name=N'DESCRIPTION'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'Ziel-URI' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'TBREC_CFG_ENDPOINT', @level2type=N'COLUMN',@level2name=N'URI'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'Angelegt von' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'TBREC_CFG_ENDPOINT', @level2type=N'COLUMN',@level2name=N'ADDED_WHO'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'Angelegt am' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'TBREC_CFG_ENDPOINT', @level2type=N'COLUMN',@level2name=N'ADDED_WHEN'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'Geaendert von' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'TBREC_CFG_ENDPOINT', @level2type=N'COLUMN',@level2name=N'CHANGED_WHO'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'Geaendert am' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'TBREC_CFG_ENDPOINT', @level2type=N'COLUMN',@level2name=N'CHANGED_WHEN'
GO

--------------------------------------------------------------------------------------

CREATE OR ALTER TRIGGER [dbo].[TBREC_CFG_ENDPOINT_AFT_UPD] ON [dbo].[TBREC_CFG_ENDPOINT]
FOR UPDATE
AS
	UPDATE [TBREC_CFG_ENDPOINT] 
	SET    [CHANGED_WHEN] = (SYSDATETIME())
	FROM   [INSERTED]
	WHERE  [TBREC_CFG_ENDPOINT].[GUID] = [INSERTED].[GUID]
GO

ALTER TABLE [dbo].[TBREC_CFG_ENDPOINT] ENABLE TRIGGER [TBREC_CFG_ENDPOINT_AFT_UPD]
GO